20 40 60 80 100

Ni_2Mn_{1.3}In_{0.7}

Ni_2Mn_{1.35}In_{0.65}

Ni_2Mn_{1.4}In_{0.6}

Ni_2Mn_{1.5}In_{0.5}

Intensity (arb. units)

2

(degrees)

Data Fit Difference Bragg Position